-- ----------------------------
-- Table structure for nbi_secure_log
-- ----------------------------
DROP TABLE IF EXISTS "nbi_secure_log";
CREATE TABLE "nbi_secure_log" (
  "id" integer NOT NULL,
  "created_at" text(3),
  "pri" text,
  "vendor" text,
  "ne_name" text,
  "rm_uid" text,
  "ne_type" text,
  "log_type" text,
  "event_name" text,
  "start_time" text,
  "user_name" text,
  "terminal_ip" text,
  "oper_result" text,
  PRIMARY KEY ("id")
);

-- ----------------------------
-- Records of nbi_secure_log
-- ----------------------------
