-- ----------------------------
-- Table structure for nbi_alarm_log
-- ----------------------------
DROP TABLE IF EXISTS "nbi_alarm_log";
CREATE TABLE "nbi_alarm_log" (
  "id" integer NOT NULL,
  "op_user" text(16),
  "src_ip" text(64) NOT NULL,
  "ne_type" text(16),
  "ne_id" text(32),
  "alarm_seq" integer(11) NOT NULL,
  "alarm_id" text(32),
  "alarm_code" integer(11),
  "alarm_status" integer(11),
  "event_time" text(32),
  "log_time" text NOT NULL,
  "a_id" integer(11) NOT NULL,
  PRIMARY KEY ("id")
);

-- ----------------------------
-- Records of nbi_alarm_log
-- ----------------------------
