--
-- Table structure for table `ne_state`
--
DROP TABLE IF EXISTS `ne_state`;
CREATE TABLE `ne_state` (
  `id` int NOT NULL AUTO_INCREMENT,
  `ne_id` bigint DEFAULT '0' COMMENT '网元ID',
  `create_time` bigint DEFAULT '0' COMMENT '创建时间',
  `sys_cpu_usage` float DEFAULT '0' COMMENT 'cpu使用率-sys',
  `sys_mem_usage` float DEFAULT '0' COMMENT '内存使用率-sys',
  `sys_disk_usage` float DEFAULT '0' COMMENT '磁盘使用率-sys',
  `nf_cpu_usage` float DEFAULT '0' COMMENT 'cpu使用率-nf',
  `nf_mem_used` bigint DEFAULT '0' COMMENT '内存使用KB-nf',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `idx_state_ne_at` (`ne_id`,`create_time`) USING BTREE COMMENT '索引-网元_创建时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='网元_状态记录内存/CPU/磁盘';
