SET FOREIGN_KEY_CHECKS = 0;

INSERT IGNORE INTO `OBJ_360`.`param_99`(`level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `initValue`, `readValue`) VALUES (99, 2, 1, 2, 0, 0, 0, 0, 0, 0, '0000', '0', '0');

SET FOREIGN_KEY_CHECKS = 1;