SET FOREIGN_KEY_CHECKS = 0;

UPDATE `OBJ_350`.`paramConf` SET `setTemplate_1` = 'smpp7def7=0;smpp8dcs4def7=1;smpp8dcs0def7=2;smpp7def8=16;smpp8dcs4def8=17;smpp8dcs0def8=18;smpp8dcs0Unpack7=19', `setTemplate_2` = 'smpp7def7=0;smpp8dcs4def7=1;smpp8dcs0def7=2;smpp7def8=16;smpp8dcs4def8=17;smpp8dcs0def8=18;smpp8dcs0Unpack7=19' WHERE `name_1` = 'smppDataCodingScheme' AND `name_2` = 'smppDataCodingScheme' LIMIT 1;

SET FOREIGN_KEY_CHECKS = 1;