/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.4.95
 Source Server Type    : MySQL
 Source Server Version : 100621 (10.6.21-MariaDB-0ubuntu0.22.04.2)
 Source Host           : 192.168.4.95:3306
 Source Schema         : RAID_DB

 Target Server Type    : MySQL
 Target Server Version : 100621 (10.6.21-MariaDB-0ubuntu0.22.04.2)
 File Encoding         : 65001

 Date: 17/06/2025 16:58:43
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for raid_status
-- ----------------------------
DROP TABLE IF EXISTS `raid_status`;
CREATE TABLE `raid_status`  (
  `sysTypeNo` int NOT NULL,
  `sysNo` int NOT NULL,
  `instance` int NOT NULL,
  `fieldName` varchar(32) CHARACTER SET latin1 COLLATE latin1_swedish_ci NOT NULL,
  `fieldValue` varchar(64) CHARACTER SET latin1 COLLATE latin1_swedish_ci NOT NULL,
  `updateTime` datetime NOT NULL,
  PRIMARY KEY (`sysTypeNo`, `sysNo`, `instance`, `fieldName`) USING BTREE
) ENGINE = MyISAM CHARACTER SET = latin1 COLLATE = latin1_swedish_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
