SET FOREIGN_KEY_CHECKS = 0;

INSERT IGNORE INTO `OBJ_320`.`param_99` (`level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `initValue`, `readValue`) VALUES (99, 2, 1, 2, 0, 0, 0, 0, 0, 0, '0000', '', '');

INSERT IGNORE INTO `OBJ_320`.`param_0`(`subSysNo`, `paramType`, `level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `sortNo`, `valueType`, `operType`, `length`, `initValue`, `readValue`) VALUES (0, 2, 99, 2, 1, 2, 0, 0, 0, 0, 0, 0, 0, 0, 4, 2, 1, '00', '00');

INSERT IGNORE INTO `OBJ_320`.`param_1`(`subSysNo`, `paramType`, `level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `sortNo`, `valueType`, `operType`, `length`, `initValue`, `readValue`) VALUES (1, 2, 99, 2, 1, 2, 0, 0, 0, 0, 0, 0, 0, 0, 4, 2, 1, '', '');

SET FOREIGN_KEY_CHECKS = 1;