SET FOREIGN_KEY_CHECKS = 0;

UPDATE `OBJ_350`.`paramConf` SET `setTemplate_1` = 'smpp7def7=0;smpp8dcs4def7=1;smpp8dcs0def7=2;smpp7def8=16;smpp8dcs4def8=17;smpp8dcs0def8=18;smpp8dcs0Unpack7=19', `setTemplate_2` = 'smpp7def7=0;smpp8dcs4def7=1;smpp8dcs0def7=2;smpp7def8=16;smpp8dcs4def8=17;smpp8dcs0def8=18;smpp8dcs0Unpack7=19' WHERE `name_1` = 'smppDataCodingScheme' AND `name_2` = 'smppDataCodingScheme' LIMIT 1;

INSERT IGNORE INTO `OBJ_350`.`param_99`(`level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `initValue`, `readValue`) VALUES (99, 2, 1, 2, 0, 0, 0, 0, 0, 0, '0000', '', '');

INSERT IGNORE INTO `OBJ_350`.`param_0`(`level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `initValue`, `readValue`) VALUES (99, 2, 1, 2, 0, 0, 0, 0, 0, 0, '0000', '0', '0');

INSERT IGNORE INTO `OBJ_350`.`param_1`(`level_1`, `level_2`, `level_3`, `level_4`, `level_5`, `level_6`, `level_7`, `level_8`, `level_9`, `level_10`, `instanceNo`, `initValue`, `readValue`) VALUES (99, 2, 1, 2, 0, 0, 0, 0, 0, 0, '0000', '0', '0');

SET FOREIGN_KEY_CHECKS = 1;